The ``common logarithm'' is the log to base 10.
It has no (pure) mathematical interest (cf, Hardy and Wright, p.8).
It had some use, I suppose, when people used manual log lookup tables
instead of calculators (so you could read off a log by looking at
-decimal- digits).
